POSTGRES_USER=admin
POSTGRES_PASS=admin123456
POSTGRES_DBNAME=rogdb
DATABASE=postgres
PG_HOST=172.31.25.76
PG_PORT=5432
GS_VERSION=2.20.0
GEOSERVER_PORT=8600
GEOSERVER_DATA_DIR=/opt/geoserver/data_dir
GEOWEBCACHE_CACHE_DIR=/opt/geoserver/data_dir/gwc
GEOSERVER_ADMIN_PASSWORD=geoserver
GEOSERVER_ADMIN_USER=admin
INITIAL_MEMORY=2G
MAXIMUM_MEMORY=3G
SECRET_KEY=django-insecure-o-d6a5mrhc6#=qqb^-c7@rcj#=cjmrjo$!5*i!uotd@j&f_okb
DEBUG=True
ALLOWED_HOSTS=rogaining.sumasen.net
S3_REGION="us-west-2"
S3_BUCKET_NAME="sumasenrogaining"
S3_PREFIX="#{location}/scoreboard/"
AWS_ACCESS_KEY="AKIA6LVMTADSVEB5LZ2H"
AWS_SECRET_ACCESS_KEY="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"